Installation

How to obtain

Requirements
requires at least a Pentium 200 with , a PowerPC with 2.4.1 or later, or several other platforms. Support for more platforms will be available in later versions.
For a platform to be supported easily, it must have pthread support, and the OSS sound output system, however ALSA is supported under .

Compilation and Installation
Should you run into any problems, please report them to the author at charles@kde.org.
If you have this documentation, you've probably already compiled