Configuration
All options are saved in $KDEHOME/share/config/ksysvrc. Defaults are taken from the global file ($KDEDIR/share/config/ksysvrc), if available, or else generated within . Changes to the defaults are stored in your local ksysvrc.

Recognized Sections
Recognized sections and keys plus their default values.

[Path Settings]
Keyword
Default
Description
ScriptPath	/etc/rc.d/init.d	Path to the scripts used for starting and stopping services.
RunlevelPath	/etc/rc.d	Path to the runlevel subdirectories.

[Colors]
Keyword
Default
Description
Changed	red	Color used for changed entries
New	blue	Color used for new entries

[Geometry]
Keyword
Default
Description
Width		Width of 's window
Height		Height of 's

[Other Settings]
Keyword
Default
Description
ToolBar	true	If the toolbar is enabled or not
StatusBar	true	If the statusbar is enabled or not
ShowLog	true	If the log window is shown or not
PanningFactor	80	100 - PanningFactor = percentage of window reserved for the logfile display