The Screen

Overview
, like most GUI based programes, divides the screen up into several areas. Each are used to perform a group of similar features. When you start the screen, it is initially divided into 4 major areas:
The Frame (which remains at the top of all programs run under ).
Rest deleted.

The frame
The Frame (which is not labled in the diagram above, surrounds all applications run under . For more information on Frames, please see the User Guide.