Installation

How to obtain

Requirements
In order to successfully use , you need 3.0. It is also reccomended that you have your X server set to over 8bpp, as the plants are scanned and require a rather high color depth.
All required libraries as well as itself can also be found on The home page.

Compilation and Installation