Onscreen operation
A labelled screenshot of in action
A labelled screenshot of in action
A screen shot. Note the fashionable lack of a titlebar.
The Odometer is the total distance traveled by the mouse since the last odometer reset. The Tripometer is the distance traveled by the mouse since:

Menu Options
If you've gotten this far, you probably already know that there is a mouse button context menu on , which contains a number of choices.
Enable 	 Toggle mileage tracking. This is good if you want to cheat on your mileage. Note: This is illegal in most countries
Metric Display 	 Because was written by an American, it obnoxiously assumes you want to use Inches/Feet/Miles for measurement. If you come from some more modern country in Europe, to use metric measurements, turn on this option.
Auto Reset Trip 	 This option will cause to set the Tripometer back to zero every time it starts up.
Reset Trip 	 Set the tripometer to zero.
Reset Odometer 	 Set the odometer back to zero. You might get in trouble for this!
About Mousepedometa 	 Pops up a little dialog box with information on who to blame for the program.
Help 	 This menu entry opens up the help - this very document.
Quit 	 Quit