Settings

Configuration options
In the Mixer item, under Sound in , you can set various options for :
Save current volumes 	Save the current sound settings to load later.
Load volumes 	Load sound settings which were previously saved.
Load volumes on login 	Automatically load the previous settings when you start .
Maximum number of probed mixers 	How many different soundcards should look for when starting. Set this low to speed up 's startup time.
Maximum number of probed devices per mixer 	How many devices to look for per soundcard. Again, set this low to speed up .