In this module, you can configure basic settings for , the terminal. You can also easily create new schemata (appearance files) for .
This module contains several tab pages: General, Schema, Session and Write Daemon.

General
This tab page allows you to configure aspects of 's functions. It contains the following options:
Use Konsole as default terminal application 	 If you wish to have use another terminal application by default, uncheck this box and enter the preferred application (wterm, rxvt, ) in the text field below.
Show Terminal Size when Resizing 	 By default, will show the size (in characters) of the window when you are resizing, allowing you to make the window a specific size. Uncheck this box to turn off this behavior
Show Frame 	 Draw an inner frame around the inside of the window.
Warn for Open Session on Quit 	 When set, a warning appears when you try to close a window with multiple sessions.
Blinking Cursor 	If you have trouble spotting the cursor in the window, you can have it blink to draw your attention.
Line Spacing 	Change the space between lines of text.
Consider the following characters part of a word when double clicking 	It is a common behavior to select a whole word when you double click on it, however, the computer's idea of a word may differ from yours. Add characters here that you would like to be considered always to be part of a word. For example, adding the @ character will allow you to double click to select an entire email address.

Schema
The Schema page will allow you to easily create, edit and save schemata, with text and background coloring, transparency and background images.

Section Author
Jonathan Singer jsinger@leeta.net