Encryption Configuration

Introduction
Many applications within are capable of exchanging information using encrypted files and/or network transmissions.

Use
All encryption schemes are only as strong as their weakest link. In general, unless you have some previous training/knowledge, it is better to leave this module unchanged.
The options within this module can be divided into two groups.
Two options along the bottom of the module Warn on entering SSL Mode and Warn on leaving SSL mode, allow you to determine if should inform you when you enter or leave SSL encryption.
The remainder of the options are about determining which encryption methods to use, and which should not be used. Once you have selected the appropriate encryption protocols, simply click Apply to commit your changes.
Only make changes to this module if specific information about the strength or weakness of a particular encryption method is given to you from a reliable source.

Section Author
This section written by Mike McBride mpmcbride7@yahoo.com.