Alarm Daemon
This module allows you to configure , the alarm daemon from the kdepim package. It will not be available if you have not installed this package.
There are only two options for this module:
Start alarm daemon automatically at login 	 Check this to start the alarm daemon whenever you start a session.
Check interval [minutes] 	 How long (in minutes) the alarm daemon should wait between checks for alarms coming due.
These settings apply to every application which uses the alarm daemon. Currently, the applications which use it include and . For more information, see their respective handbooks.

Section Author
Lauri Watts lauri@kde.org