The Handbook
is an archive manager for .

Introduction
is a program for managing various archive formats within the environment. Archives can be viewed, extracted, created and modified from within . The program can handle various formats such as tar, gzip, bzip2, zip and lha (if appropriate command-line programs are installed). works closely with in the environment to handle archives.