Installation

How to obtain

Requirements
In order to successfully use , you need 2 and xanim 2.70.7.0 or higher. Full screen mode requires VidMode and DGA extensions to be installed and working.
All required libraries as well as itself can be found on The home page and the Xanim home page

Compilation and Installation

Configuration
Don't forget to install xanim before .