Using
Here's a screenshot of
Screenshot
Basic use of is very simple. Right click in the main window or select the open icon in the toolbar, choose the movie you wish to watch, and press the OK button.

The Context Menu
The Context menu is accessed by clicking the right mouse button over the playback window. It is used to quickly change the playback size, open video files and access the video file information dialog.
The Context menu is described further in The Video Context Menu.

Full Screen
It is possible to watch video playback in full-screen. Right click anywhere in and choose Full screen. To exit, left or right click on the screen. You may need to enable this feature if it does not currently work.
If possible, use the XFree86 VidMode and DGA extensions. These extensions allow the application to automatically change the screen resolution to better fit the size of the video. Traditionally a video of, say, 320x200 would be scaled up on a 800x600 display. This scaling requires extra work and the result is not appealing at all. In the setup dialog there are two check boxes of interest:
Use XFree86-VidModeExtensions (if available) 	enable full screen mode
Grab the mouse 	 takes control of the mouse in full screen mode